0 1 2 3 4 5 6 7 8 9 -60 -40 -20 0 20 40 60

45m U (cm/s) u_{fit}=A+Bt+Ccos(ft)+Dsin(ft) A= -3.9861± 0.57354 B= -2.3489e-05 ± 1.2861e-06 C= 27.6838± 0.40885 D= 14.5032± 0.40812 Misfit to data sqrt((Gm-d)^T(Gm-d))= 147.422

North and East Components of 45m Current Speed After Passage of Hurricane Felix U fitted U

0 1 2 3 4 5 6 7 8 9 -60 -40 -20 0 20 40 60

Day Number

45m V (cm/s) v_{fit}=A+Bt+Ccos(ft)+Dsin(ft) A= 10.3816± 0.57354 B= -1.0403e-05 ± 1.2861e-06 C= 13.9932± 0.40885 D= -29.9383± 0.40812 Misfit to data sqrt((Gm-d)^T(Gm-d))= 139.1902

V fitted V